
-- ----------------------------
-- Records of camera_status
-- ----------------------------
INSERT INTO "public"."camera_status" VALUES (2, 'yingshi', '5000', '服务端内部处理异常', '服务端内部错误码', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (3, 'yingshi', '5400', '私有化协议vtm检测私有化协议中码流类型小于0或者设备序列号为空等非法参数场景返回(app不重试取流)', '客户端参数出错', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (4, 'yingshi', '5402', '回放找不到录像文件', '设备回放找不到录像文件', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (5, 'yingshi', '5403', '操作码或信令密钥与设备不匹配', '操作码或信令密钥与设备不匹配', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (6, 'yingshi', '5404', '设备不在线', '设备不在线', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (7, 'yingshi', '5405', '流媒体向设备发送或接受信令超时/cas响应超时', '设备回应信令10秒超时', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (8, 'yingshi', '5406', 'token失效', 'token失效', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (9, 'yingshi', '5407', '客户端的URL格式错误', '客户端的URL格式错误', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (10, 'yingshi', '5409', '预览开启隐私保护', '预览开启隐私保护', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (11, 'yingshi', '5411', 'token无权限', 'token无权限、用户无权限', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (12, 'yingshi', '5412', 'session不存在', 'session不存在', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (13, 'yingshi', '5413', '验证token的他异常（不具体）', 'token验证失败', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (14, 'yingshi', '5415', '设备通道错', '设备判断请求通道不存在', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (15, 'yingshi', '5416', '设备资源受限', '设备资源受限', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (16, 'yingshi', '5451', '设备不支持的码流类型', '设备不支持的码流类型', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (17, 'yingshi', '5452', '设备链接流媒体服务器失败', '设备链接流媒体服务器失败', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (18, 'yingshi', '5454', '流媒体中关于设备取流会话不存在', '流媒体中关于设备取流会话不存在', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (19, 'yingshi', '5455', '设备通道未关联', '设备通道未关联', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (20, 'yingshi', '5456', '设备通道关联设备不在线', '设备通道关联设备不在线', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (21, 'yingshi', '5457', '客户端不支持端到端加密', '客户端不支持端到端加密', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (22, 'yingshi', '5458', '设备不支持当前并发ECDH密', '设备不支持当前并发ECDH密', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (23, 'yingshi', '5459', 'VTDU 处理ECDH 加密失败', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (24, 'yingshi', '5492', '设备不支持的命令', '设备不支持的命令', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (25, 'yingshi', '5500', '服务器处理失败', '服务器处理失败', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (26, 'yingshi', '5503', 'vtm返回分配vtdu失败', 'vtm返回分配vtdu失败', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (27, 'yingshi', '5504', '流媒体vtdu达到最大负载', '流媒体vtdu达到最大负载', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (28, 'yingshi', '5544', '设备返回无视频源', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (29, 'yingshi', '5545', '视频分享时间已经结束', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (30, 'yingshi', '5546', 'vtdu返回达到取流并发路数限制', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (31, 'yingshi', '5547', 'vtdu返回开放平台用户并发限制', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (32, 'yingshi', '5556', 'ticket校验失败', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (33, 'yingshi', '5557', '回放服务器等待流头超时', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (34, 'yingshi', '5558', '查找录像开始时间错误', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (35, 'yingshi', '5560', '群组分享取流二次验证失败', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (36, 'yingshi', '5561', '分享群组用户被锁住', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (37, 'yingshi', '5562', '群组分享用户权限变更', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (38, 'yingshi', '5563', '认证服务连接失败', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (39, 'yingshi', '5564', '认证超时', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (40, 'yingshi', '5565', '缓存无效', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (41, 'yingshi', '5566', '不在分享时间内预览', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (42, 'yingshi', '5567', '分享通道被锁定', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (43, 'yingshi', '5568', '未找到认证类型', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (44, 'yingshi', '5569', '认证返回的参数异常', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (45, 'yingshi', '5600', '分享设备不在分享时间内', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (46, 'yingshi', '5601', '群组分享用户没权限', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (47, 'yingshi', '5602', '群组分享权限变更', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (48, 'yingshi', '5530', '机房故障不可用', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (49, 'yingshi', '5701', 'cas信令返回格式错误', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (50, 'yingshi', '5702', 'SPGW请求Cas、Status透传超时', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (51, 'yingshi', '5703', 'SPGW请求http不通', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (52, 'yingshi', '6001', '客户端参数出错', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (53, 'yingshi', '6099', '客户端默认错误', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (54, 'yingshi', '6101', '不支持的命令', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (55, 'yingshi', '6102', '设备流头发送失败', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (56, 'yingshi', '6103', 'cas/设备返回错误1', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (57, 'yingshi', '6104', 'cas/设备返回错误-1', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (58, 'yingshi', '6105', '设备返回错误码3', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (59, 'yingshi', '6106', '设备返回错误码4', '一般常见于多通道设 备预览 1、通道不存在 2、通道子码流不存在 3、通道不在线', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (60, 'yingshi', '6107', '设备返回错误码5', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (61, 'yingshi', '6108', 'cas信令回应重复', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (62, 'yingshi', '6109', '视频广场取消分享', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (63, 'yingshi', '6110', '设备信令默认错误', '设备错误返回的错误码，不具体', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (64, 'yingshi', '6501', '设备数据链路和实际链路不匹配', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (65, 'yingshi', '6502', '设备数据链路重复建立连接', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (66, 'yingshi', '6503', '设备数据链路端口不匹配', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (67, 'yingshi', '6504', '缓存设备数据链路失败(内存块不足)', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (68, 'yingshi', '6505', '设备发送确认头消息重复', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (69, 'yingshi', '6506', '设备数据先于确定头部到达', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (70, 'yingshi', '6508', '设备数据头部长度非法', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (71, 'yingshi', '6509', '索引找不到设备数据管理块', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (72, 'yingshi', '6510', '设备数据链路vtdu内存块协议状态不匹配', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (73, 'yingshi', '6511', '设备数据头部没有streamkey错误', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (74, 'yingshi', '6512', '设备数据头部非法(较笼统)', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (75, 'yingshi', '6513', '设备数据长度过小', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (76, 'yingshi', '6514', '设备老协议推流头部没有streamkey错误', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (77, 'yingshi', '6515', '设备老协议推流数据非法', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (78, 'yingshi', '6516', '设备老协议索引找不到内存管理块', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (79, 'yingshi', '6517', '设备老协议推流数据非法', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (80, 'yingshi', '6518', '设备数据包过大', NULL, 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (81, 'yingshi', '6519', '设备推流链路网络不稳定', '设备长时间未推流超时', 'f', NULL);
INSERT INTO "public"."camera_status" VALUES (82, 'yingshi', '6520', '设备推流链路网络不稳定(默认)', '设备网络异常', 'f', NULL);





-- ----------------------------
-- Records of camera_status_resolve
-- ----------------------------
INSERT INTO "public"."camera_status_resolve" VALUES (2, 2, '检测服务端是否正常');
INSERT INTO "public"."camera_status_resolve" VALUES (3, 3, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (4, 4, '检查是否有存储卡并且接触良好');
INSERT INTO "public"."camera_status_resolve" VALUES (5, 6, '检查设备网络');
INSERT INTO "public"."camera_status_resolve" VALUES (6, 6, '重启设备接入萤石云');
INSERT INTO "public"."camera_status_resolve" VALUES (7, 7, '检查设备网络');
INSERT INTO "public"."camera_status_resolve" VALUES (8, 7, '重启设备');
INSERT INTO "public"."camera_status_resolve" VALUES (9, 8, '刷新重试或者重启设备');
INSERT INTO "public"."camera_status_resolve" VALUES (10, 9, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (11, 13, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (12, 14, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (13, 15, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (14, 16, '刷新重试或者切换到高清模式');
INSERT INTO "public"."camera_status_resolve" VALUES (15, 17, '检查设备网络，重启设备，刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (16, 19, '检查设备通道是否关联');
INSERT INTO "public"."camera_status_resolve" VALUES (17, 20, '检查设备通道是否上线');
INSERT INTO "public"."camera_status_resolve" VALUES (18, 25, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (19, 26, 'vtdu服务异常，请请稍后重试');
INSERT INTO "public"."camera_status_resolve" VALUES (20, 27, '服务器负载达到上限，请稍后重试');
INSERT INTO "public"."camera_status_resolve" VALUES (21, 28, '设备是否接触良好');
INSERT INTO "public"."camera_status_resolve" VALUES (22, 28, '如果一直无法解决，请联系技术支持');
INSERT INTO "public"."camera_status_resolve" VALUES (23, 30, '请升级为企业版，放开并发限制');
INSERT INTO "public"."camera_status_resolve" VALUES (24, 31, '请确定开放平台用户预览是否超过用户并发数量限制');
INSERT INTO "public"."camera_status_resolve" VALUES (25, 33, '刷新重试，检测设备网络，重启设备');
INSERT INTO "public"."camera_status_resolve" VALUES (26, 48, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (27, 49, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (28, 50, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (29, 51, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (30, 52, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (31, 54, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (32, 55, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (33, 56, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (34, 57, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (35, 58, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (36, 59, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (37, 60, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (38, 61, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (39, 63, '刷新重试，或者重启设备');
INSERT INTO "public"."camera_status_resolve" VALUES (40, 64, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (41, 65, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (42, 66, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (43, 67, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (44, 68, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (45, 69, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (46, 70, '刷新重试，或者重启设备');
INSERT INTO "public"."camera_status_resolve" VALUES (47, 71, '刷新重试');
INSERT INTO "public"."camera_status_resolve" VALUES (48, 80, '刷新重试，或者重启设备');

