insert into  t_adapter(adapter_name, adapter_version, tool_name, description, config) values ('PostgreSQL采集适配器','9.X','PostgreSQL数据库','采集数据数据库结构及相关对象','{"param":"参数名","title":"标题","value":"参数值","description":"描述"}');