create table fire_alarm
(
    id            serial
        constraint fire_alarm_pk
            primary key,
    "createTime"  timestamp(6) with time zone,
    location      text,
    scene         varchar(255),
    fire_material varchar(255),
    level         varchar(255),
    state         integer default 1,
    longitude     varchar(50),
    latitude      varchar(50),
    type          varchar(50),
    type_param    varchar(50)
);

comment on table fire_alarm is '智慧消防大屏 告警上报表';

comment on column fire_alarm."createTime" is '创建时间';

comment on column fire_alarm.location is '地点';

comment on column fire_alarm.scene is '场所';

comment on column fire_alarm.fire_material is '燃烧物质';

comment on column fire_alarm.level is '危险等级';

comment on column fire_alarm.state is '事件状态：1 进行中 2已结束';

comment on column fire_alarm.type is '警情类型';

comment on column fire_alarm.type_param is '警情类型对应的不同属性 ';

create unique index fire_alarm_id_uindex
    on fire_alarm (id);

