DROP TABLE IF EXISTS "public"."dbStatistics";
CREATE TABLE "public"."dbStatistics" (
  id serial NOT NULL PRIMARY KEY,
  "dbName" varchar(255) COLLATE "pg_catalog"."default" NOT NULL,
  "sourceId" int4 NOT NULL,
  "dbRecordCount" int8 NOT NULL,
  "time" timestamptz NOT NULL,
  "description" varchar(255) NULL
);