INSERT INTO "public"."user_resource" VALUES (default, 1, 'STRUCTURE_MANAGE');
INSERT INTO "public"."user_resource" VALUES (default, 1, 'STRU_INFO_CONFIG');
INSERT INTO "public"."user_resource" VALUES (default, 1, 'QR_CODE_CONFIG');
INSERT INTO "public"."user_resource" VALUES (default, 1, 'PATROL_MANAGE');
INSERT INTO "public"."user_resource" VALUES (default, 1, 'PATROL_PLAN_CONFIG');
INSERT INTO "public"."user_resource" VALUES (default, 1, 'PATROL_RECORD_VIEW');
INSERT INTO "public"."user_resource" VALUES (default, 1, 'REPAIR_MANAGE');
INSERT INTO "public"."user_resource" VALUES (default, 1, 'HANDLE_REPAIR');
INSERT INTO "public"."user_resource" VALUES (default, 1, 'ORG_MANAGE');
INSERT INTO "public"."user_resource" VALUES (default, 1, 'USER_CONFIG');
INSERT INTO "public"."user_resource" VALUES (default, 1, 'AUTH_CONFIG');