create table exception_type_check
(
	id serial not null,
	user_id int not null,
	type_id integer[]
);

create unique index exception_type_check_id_uindex
	on exception_type_check (id);

alter table exception_type_check
	add constraint exception_type_check_pk
		primary key (id);

