INSERT INTO "public"."t_resource" VALUES ('ORG_MANAGE', '组织管理', NULL);
INSERT INTO "public"."t_resource" VALUES ('ORG_MEMBER', '用户管理', 'ORG_MANAGE');
INSERT INTO "public"."t_resource" VALUES ('ORG_AUTH', '权限配置', 'ORG_MANAGE');
INSERT INTO "public"."t_resource" VALUES ('OPERATION_LOG', '操作日志', NULL);
INSERT INTO "public"."t_resource" VALUES ('OPERATION_LOG_VIEW', '操作日志查看', 'OPERATION_LOG');
INSERT INTO "public"."t_resource" VALUES ('PUMP_CONTROL', '泵站控制', NULL);
INSERT INTO "public"."t_resource" VALUES ('PUMP_WATER_CONTROL', '泵站水泵控制', 'PUMP_CONTROL');
INSERT INTO "public"."t_resource" VALUES ('MONITORING_SCOPE', '泵站监测', NULL);
INSERT INTO "public"."t_resource" VALUES ('PUMP_STATION_3569', '八月湖二站', 'MONITORING_SCOPE');
INSERT INTO "public"."t_resource" VALUES ('PUMP_STATION_3590', '张坊电排站', 'MONITORING_SCOPE');
INSERT INTO "public"."t_resource" VALUES ('PUMP_STATION_3592', '东山电排站', 'MONITORING_SCOPE');
INSERT INTO "public"."t_resource" VALUES ('PUMP_STATION_3593', '利用站', 'MONITORING_SCOPE');
INSERT INTO "public"."t_resource" VALUES ('PUMP_STATION_3594', '杨家湾站', 'MONITORING_SCOPE');
INSERT INTO "public"."t_resource" VALUES ('PUMP_STATION_3595', '汇仁大道补水站', 'MONITORING_SCOPE');
INSERT INTO "public"."t_resource" VALUES ('PUMP_STATION_3596', '河下电排站', 'MONITORING_SCOPE');
INSERT INTO "public"."t_resource" VALUES ('PUMP_STATION_3597', '石岐补水站', 'MONITORING_SCOPE');
INSERT INTO "public"."t_resource" VALUES ('PUMP_STATION_3598', '石岐电排站', 'MONITORING_SCOPE');
INSERT INTO "public"."t_resource" VALUES ('PUMP_STATION_3599', '三山电排站', 'MONITORING_SCOPE');
INSERT INTO "public"."t_resource" VALUES ('PUMP_STATION_3600', '万寿湖电排站', 'MONITORING_SCOPE');
INSERT INTO "public"."t_resource" VALUES ('PUMP_STATION_3601', '河外电排站', 'MONITORING_SCOPE');
INSERT INTO "public"."t_resource" VALUES ('PUMP_STATION_3642', '沥山电排站', 'MONITORING_SCOPE');
INSERT INTO "public"."t_resource" VALUES ('PUMP_STATION_3652', '象湖泵站', 'MONITORING_SCOPE');
INSERT INTO "public"."t_resource" VALUES ('PUMP_STATION_3653', '雄溪泵站', 'MONITORING_SCOPE');

INSERT INTO "public"."t_user_resource" VALUES (default, 1, 'ORG_MANAGE');
INSERT INTO "public"."t_user_resource" VALUES (default, 1, 'ORG_MEMBER');
INSERT INTO "public"."t_user_resource" VALUES (default, 1, 'ORG_AUTH');
INSERT INTO "public"."t_user_resource" VALUES (default, 1, 'OPERATION_LOG');
INSERT INTO "public"."t_user_resource" VALUES (default, 1, 'OPERATION_LOG_VIEW');
INSERT INTO "public"."t_user_resource" VALUES (default, 1, 'PUMP_CONTROL');
INSERT INTO "public"."t_user_resource" VALUES (default, 1, 'PUMP_WATER_CONTROL');
INSERT INTO "public"."t_user_resource" VALUES (default, 1, 'MONITORING_SCOPE');
INSERT INTO "public"."t_user_resource" VALUES (default, 1, 'PUMP_STATION_3569');
INSERT INTO "public"."t_user_resource" VALUES (default, 1, 'PUMP_STATION_3590');
INSERT INTO "public"."t_user_resource" VALUES (default, 1, 'PUMP_STATION_3592');
INSERT INTO "public"."t_user_resource" VALUES (default, 1, 'PUMP_STATION_3593');
INSERT INTO "public"."t_user_resource" VALUES (default, 1, 'PUMP_STATION_3594');
INSERT INTO "public"."t_user_resource" VALUES (default, 1, 'PUMP_STATION_3595');
INSERT INTO "public"."t_user_resource" VALUES (default, 1, 'PUMP_STATION_3596');
INSERT INTO "public"."t_user_resource" VALUES (default, 1, 'PUMP_STATION_3597');
INSERT INTO "public"."t_user_resource" VALUES (default, 1, 'PUMP_STATION_3598');
INSERT INTO "public"."t_user_resource" VALUES (default, 1, 'PUMP_STATION_3599');
INSERT INTO "public"."t_user_resource" VALUES (default, 1, 'PUMP_STATION_3600');
INSERT INTO "public"."t_user_resource" VALUES (default, 1, 'PUMP_STATION_3601');
INSERT INTO "public"."t_user_resource" VALUES (default, 1, 'PUMP_STATION_3642');
INSERT INTO "public"."t_user_resource" VALUES (default, 1, 'PUMP_STATION_3652');
INSERT INTO "public"."t_user_resource" VALUES (default, 1, 'PUMP_STATION_3653');