DROP TABLE IF EXISTS "public"."t_operation_log";

CREATE TABLE "public"."t_operation_log" (
    "id" serial,
    "time" timestamptz NOT NULL,
    "client_type" varchar(512) NOT NULL,
    "content" varchar(255) NOT NULL,
    "parameter" varchar(512),
    "user_id" int4 NOT NULL,
    PRIMARY KEY ("id"),
    CONSTRAINT "operation_log_user_id_fk" FOREIGN KEY ("user_id") REFERENCES "public"."t_user" ("id") ON DELETE NO ACTION ON UPDATE NO ACTION
);

COMMENT ON COLUMN "public"."t_operation_log"."time" IS '操作时间';

COMMENT ON COLUMN "public"."t_operation_log"."client_type" IS '客户端类型';

COMMENT ON COLUMN "public"."t_operation_log"."content" IS '操作内容';

COMMENT ON COLUMN "public"."t_operation_log"."parameter" IS '操作参数';

COMMENT ON COLUMN "public"."t_operation_log"."user_id" IS '操作用户ID';